Punto G. Dónde está y cómo encontrarlo
Conquista del punto Ji. Practica el punto ji
Veronica Larsson

© Veronica Larsson, 2018

ISBN 978-5-4490-5679-5

Created with Ridero smart publishing system

El punto G es llamado por algunos científicos “OVNI ginecológico”, ya que hasta ahora, desde la apertura de esta zona en la vagina de una mujer en 1944 y la publicación de material en 1950 por el ginecólogo Ernst Grefenberg, no creen en su existencia. Otros científicos están de acuerdo con su colega, creyendo que dentro de los órganos genitales femeninos realmente hay un área determinada, cuya estimulación conduce a un orgasmo poderoso y se acompaña de la liberación de líquido.

Información General

El señor del punto G. Conquista del punto Ji. Practica el punto ji. Permitir porno.

De manera muy natural, surgen preguntas y existe el deseo de establecer paralelismos con el organismo masculino. En este caso, los ginecólogos y la urología son unánimes: los hombres tienen exactamente el mismo punto G, cuyo análogo es la próstata.

Con su estimulación, el hombre está en el proceso no solo de amplificar las sensaciones, sino también de desarrollar un secreto alcalino responsable de la velocidad de movimiento de los espermatozoides. Y la composición y características de los tejidos de la glándula de la piel, de los cuales la vagina femenina consiste, y la glándula de la próstata son muy similares y producen un secreto líquido similar.

Y si la sensibilidad de la próstata en los hombres es independiente de la edad y el estado hormonal, entonces las mujeres experimentan la activación de las sensaciones en la región de G después de 30 años, y depende directamente del nivel de la hormona estrógeno.

Entonces, con la próstata como el lugar más sensible entre otras zonas erógenas masculinas, todo está claro. ¿Y qué pasa con su homólogo femenino, realmente existe? En el año 2002, el Comité Internacional Federal de Terminología anatómica del cuerpo a llamarse, llama la glándula de Skene la hembra, la próstata femenina.

Es en este cuerpo, que pesa 5 gramos, y es un punto que es responsable de un orgasmo vaginal en mujeres. Se observa que hasta 30 años, las mujeres en su mayoría observan un orgasmo clitorial. Es por eso que la estimulación de la “próstata femenina” con su punto G no es tan efectiva en este período de edad.

Con la edad, la disminución de los niveles de estrógeno, las paredes vaginales se vuelven más delgadas las mujeres, y por lo tanto una mayor susceptibilidad a la estimulación del punto G. Este mito explica que todo el placer del sexo de la mujer empieza a ser en los últimos años, después de 35 años. Por lo tanto, toma su nombre, “Balzac Edad”, el apogeo de la mujer madura y con experiencia que viene incluso después hormonal normal cambia el cuerpo (que no debe confundirse con la menopausia).

En la literatura especial hay otra designación para las glándulas de la piel – “U-point”. Se caracteriza como un órgano vestigial del sistema reproductor femenino, situado en la pared uretral posterior, justo en frente del punto G en la vagina. Los conductos del punto U abren la uretra. En cualquier caso, no importa qué letras del alfabeto latino no se utiliza en la designación de áreas importantes en la próstata femenina, podemos decir que el valor de G zona erógena en el cuerpo es innegable.

Конец ознакомительного фрагмента.

Текст предоставлен ООО «ЛитРес».

Прочитайте эту книгу целиком, купив полную легальную версию на ЛитРес.

Безопасно оплатить книгу можно банковской картой Visa, MasterCard, Maestro, со счета мобильного телефона, с платежного терминала, в салоне МТС или Связной, через PayPal, WebMoney, Яндекс.Деньги, QIWI Кошелек, бонусными картами или другим удобным Вам способом.