Widerstand ist zwecklos

Titel Seite

1. Kapitel

2. Kapitel:

3.Kapitel

4.Kapitel

Widerstand ist zwecklos

1. Kapitel

Mehr als zwanzig Jahre ist es nun her, dass die Voyager wieder auf der Erde angekommen ist. Vor etwa drei Monaten war Jahrestag und alle, die noch dazu im Stande und nicht auf Mission waren, sind gekommen. Alt sind sie geworden, denkt Annika. Janeway kam natürlich, sie ist ja nun Admiral und fast nur noch auf dem Heimatplaneten. Chakotay ist faltig geworden und kam in Stammestracht, was ihn unter all den Uniformierten gänzlich heraus hob und fast lächerlich wirkte. Harry Kim war als Captain unterwegs und auch Naomi Wildman konnte aufgrund eines Einsatzes nicht da sein. Gerade über sie hätte sich Annika sehr gefreut.

Zur Zeit arbeitet sie in einem wissenschaftlichen Labor zur Untersuchung altertümlicher Artefakte fremder Planeten. Die Kenntnis vieler Spezies der Quadranten durch ihre Zeit bei den Borg und ihr astrometrisches Wissen machten sie perfekt für diese Arbeit. Nie wieder würde sie ein Raumschiff betreten, schwor sie sich und bisher hat sie das auch eingehalten. Jedes halbe Jahr trifft sie den Doktor, der sie sehr gut kennt und dem sie vertraut. Andere Ärzte würden ihr nur die wenigen verbliebenen Borg-Implantate entfernen wollen. Obwohl der Doktor nicht mehr als Arzt praktiziert und sich lieber der Kunst in allen erdenklichen Richtungen widmet, freut er sich jedes mal sehr, wenn er Annika untersuchen soll, seine wohl größte medizinische Leistung.

Annika blickt in den Spiegel und sieht immer noch gut aus, obwohl sie die sechzig schon überschritten hat. Die Nanosonden leisten gute Arbeit, wenn ihre Anzahl doch schon sehr gesunken ist. Viele wurden zu Untersuchungszwecken entfernt, andere versagten einfach den Dienst. Bei den Borg hätte sie etwa alle zwei Jahre neue Nanosonden bekommen. Niemand sonst hat wohl so alte Nanosonden in seinem Körper. Sie hatte geheiratet, bei einer Therapiesitzung hatte sie einen Mann kennengelernt, der auch von den Borg getrennt wurde. Aber die Ehe währte nur 5 Jahre, dann verstarb er, denn er hat das Entfernen der Implantate nicht so gut verkraftet wie Annika. Dann fielen seine Nanosonden innerhalb weniger Wochen aus und er war nicht mehr zu retten.

Seit dem hat sie furchtbare Angst, ihr könnte dasselbe passieren. Doch der Doktor hat mit ihrer Hilfe ihren Alkoven aus der Voyager ausgebaut und modifiziert. Nur einmal im Monat soll sie darin schlafen, damit die Nanosonden weiter funktionieren. Ihr Mann hatte keinen solchen Alkoven und hätte sich auch niemals wieder in einen solchen hinein begeben.

Annika ist zufrieden mit sich und ihrem Leben, frühstückt, dann duscht sie, zieht sich an und begibt sich zur nächsten Schnellbahnstation.

So ist sie in wenigen Minuten an ihrem Arbeitsplatz. Dieser befindet sich im astrohistorischem Institut.

Sie untersucht gerade ein Stück veldorianisches Glas mit seltsamen Schriftzeichen darauf, als sie einen Videoanruf erhält.

Sie freut sich sehr, als sie den Namen des Anrufers entziffert:

Leutnant Naomi Wildman.

Hastig drückt sie auf den Knopf und eine aufgeregt wirkende Naomi erscheint auf dem Monitor.

„Wir haben etwas gefunden, das musst du dir ansehen!“, tönt es. „Du wirst nicht glauben, was wir gefunden haben.“

„Was ist es?“, fragt Annika zurück.

„Borg“, lautet die Antwort.

„Das ist doch nichts ungewöhnliches“, man hört ihrer Stimme an, dass sie etwas enttäuscht ist. Borg. Fast jeden Monat gibt es was von den Borg. Seit dem Kampf mit der Voyager hat es keinen größeren Zwischenfall mehr gegeben, aber da beide Parteien ihr Territorium erweitern, sind Begegnungen recht häufig. Die Verbesserung der Föderationsschiffe mit Hirogen-Technologie sorgt dafür, dass nur kleine schwache Schiffe angegriffen werden.

„Es ist aber kein gewöhnliches Schiff. Wir haben herausgefunden, dass es ungefähr 1000 Jahren alt ist. Der größte Teil funktioniert noch, die Crew ist tot, aber es fliegt weiter. Mein Schiff begleitet es, um es zu untersuchen. Ich würde mich freuen, wenn du mir helfen würdest. Ich weiß, dass du nicht mehr gerne fliegst, aber eine solche Chance sollten wir uns nicht entgehen lassen.“ Annika überlegt kurz. Sie hat hier eine zwar manchmal etwas eintönige Arbeit, aber dennoch eine sinnvolle Beschäftigung. Aber sie vermisst auch das Neue, das Unbekannte. „Ich melde mich später bei dir, ich muss vorerst abklären, ob das in Ordnung geht. Aber das sollte kein Problem sein.“

Anschließend bittet sie bei ihrem Vorgesetzten, für diese Mission freigestellt zu werden. Dieser sagt zu, aber sie müsse sich um alle erforderlichen Genehmigungen und Ausrüstung selbst bemühen. Auch wenn es sich um eine das Institut betreffende Forschung handelt.

Wieder an ihrem Arbeitsplatz kontaktiert sie Naomi.

„Ich versuche, Tom Paris als Piloten zu organisieren, vielleicht kommt der Doktor auch mit, der ist ja auch Experte für Borg-Technologie und durch den mobilen Emitter sehr brauchbar, denke ich.“, meldet Annika.

„Ich wusste, dass du nicht nein sagen würdest“,lächelt Naomi in die Kamera.

Annika atmet tief durch, als der Anruf beendet ist und ihr so langsam bewusst wird, was sie da vor hat.

Sie kontaktiert Tom Paris, der mittlerweile ein kleineres Transportunternehmen leitet. Sein bestes Schiff ist ein Nachbau des Schiffes „Alice“, das er einst im Delta-Quadranten gefunden und repariert hatte, nur ohne das cerebrale Kommunikations-Interface.

Tom zeigt sich sehr erfreut über etwas Abwechslung. Auch B‘elana kommt ans Terminal und fragt, wie lange die Mission wohl dauern würde. Das kann Annika nicht genau sagen, aber sie rechnet mit etwa 2-3 Monaten.

Das hält die Halbklingonin für angemessen und vertretbar.

„So, dann haben wir also schon mal ein Schiff, einen Piloten, einen Experten und einen Missionsleiter. Fehlt nur noch ein Schiffsarzt“, witzelt der Doktor, der aber auch einwilligt.

Eine Woche später treffen sie sich in der Nähe von Marseille, wo Paris seine Firma hat.

„Die nötigen Papiere habe ich“, schmunzelt Tom, „wir sind startklar. Verpflegung und Ausrüstung sind an Bord, ich habe auch den speziellen Navigationscomputer von Seven, äh ich meine Annika, eingebaut.“

„Du darfst mich während der Mission „Seven“ nennen, aber privat bin ich natürlich Annika Hansen, das gilt für alle.“ Alle, das waren aber nur der Doktor und Tom Paris.

„Wir werden Naomi an diesen Koordinaten treffen, wenn das Schiff wirklich so schnell ist, wie Sie sagten, Tom Paris.“, und gibt ihm den Datenspeicher mit den Instruktionen. Schon war sie professionell vom „Du“ ins „Sie“ gewechselt.

„Dann hinein“, meint Tom mit einer einladenden Armbewegung.

Das Schiff ist wirklich gerade groß genug für 2 Personen, der Doktor braucht ja nicht ständig präsent zu sein.

Sanft hebt das Schiff vom Boden ab und Tom gelingt es, es fast unmerklich zu beschleunigen. Die Technik ist vom Feinsten und im Zusammenspiel mit den fliegerischen Fähigkeiten des Piloten fühlt es sich an, wie das Schweben auf einer Wolke.

Im nu sind sie im Weltraum und wenige Zeit später beschleunigen sie auf ganze Warp 8,5 , eine Geschwindigkeit, die sonst nur Föderationsschiffe erreichen. Privatschiffe schaffen meist nur Warp 6.

Nach 2 Tagen Flugzeit erreichen sie die angegebenen Koordinaten, verlangsamen auf Impulsgeschwindigkeit, um die Gegend nach der „Andromeda“ abzusuchen. Während dieser Zeit haben sie kaum gesprochen, Tom respektierte die Art Annikas, nur zwingend notwendige Kommunikation durchzuführen. Wohl gerade deshalb war sie ihm eigentlich immer sympathisch gewesen. Kein albernes Blabla, kein Tratsch.

Dann erblickt Annika etwas auf ihrem Scanner-Interface. Ein Borg-Kubus, nur etwa ein Zehntel der Größe, wie sie heutige Kuben haben. Dann, etwa 500 Kilometer dahinter die „Andromeda“, ein Forschungsschiff mit mittlerer Kampfstärke. Diese Art Schiffe werden auch für Patrouillenflüge entlang der neutralen Zone eingesetzt.

Sie empfangen eine Audio-Nachricht. „Wartet den Vorbeiflug des Kubus ab und dockt dann bei uns an. Wir wollen keine Aufmerksamkeit erregen.“

Ohne Antwort zu geben, folgt Tom den Anweisungen. Es ist richtig gespenstisch, wie der Kubus an ihnen vorbei fliegt. Aus reiner Gewohnheit rechnen sie mit einem plötzlichen Angriff, aber nichts dergleichen geschieht. Sie fliegen hinter der „Andromeda“ her und landen sicher im Hangar.

Dort werden sie von Naomi herzlich begrüßt und auch der Doktor zeigt sich.

„Wieso dieses seltsame Manöver?, fragt Tom.

„Wir haben festgestellt, dass die hintere Sensorenphalanx des Kubus wohl defekt ist. Wir haben mal probehalber einen Photonentorpedo an ihnen vorbeigeschossen, erst als er neben ihnen war, wurde er zerstört. Daher wissen wir auch, dass es gefährlich ist, ihre Aufmerksamkeit zu erregen. Unsere Scanns zeigen keine funktionierenden Drohnen an. Entweder sind sie getarnt oder tot.

Der Kurs wurde nur minimal geändert. Das ist so, weil die Karten anscheinend so alt sind wie das Schiff und deshalb sind kleinere Korrekturen erforderlich. Die Frage ist nur, wer das Schiff steuert und instand hält.“ „Und, wo es hin will.“,meint Tom.

Annika unterbricht den Redeschwall mit einer Handbewegung.

„Ich werde mir die bisherigen Untersuchungsergebnisse ansehen, dann entscheiden wir gemeinsam, wie wir weiter vorgehen werden.“

Sie geht in Richtung der Mannschaftsquartiere, und findet auch ein freies. Drinnen schließt sie schnell die Tür, und atmet erleichtert durch. Die Begegnung mit dem Kubus hatte sie sehr aufgewühlt, aber sie konnte sich immer noch sehr gut beherrschen.

Kurze Zeit später kommt Naomi herein, mit etwas Essen und Datenträgern, die die Ergebnisse ihrer bisherigen Untersuchungen enthalten. Sie nimmt neben Annika auf dem Bett Platz.

„Eigentlich sollten wir eine Doppelsternanomalie untersuchen, als unsere Scanner plötzlich diesen Kubus meldeten. Sofort gingen wir auf roten Alarm, aber wir wurden nicht angegriffen, nur gescannt. Wir scannten ebenfalls und erstaunlicherweise konnten wir alles durchdringen.“ Interessiert hört Annika zu.

„So fragten wir bei der Sternenflotte an, ob wir den Kubus vorsichtig untersuchen dürfen, der Doppelstern fliegt ja nicht weg, aber dieser Kubus könnte uns einen Vorteil im Kampf gegen die Borg verschaffen.“

Sie nehmen am Tisch Platz und setzen beim Essen die Unterhaltung fort: „Inwiefern sollte ein derart alter Kubus helfen? Die Technologie ist veraltet, viel mittlerweile sicher unbrauchbar.“ Naomi überlegt kurz, nimmt noch einen Bissen und nachdem sie ihn verschluckt hat, fährt sie fort: „Vielleicht erzählt uns der Kubus etwas über die Geschichte der Borg, wo sie herkommen, was ihr ursprüngliches Ziel war.“

„Das ist allerdings etwas.“, entgegnet Annika. „Alle uns bekannten Welten berichten, dass der Ärger mit den Borg wohl überall fast gleichzeitig angefangen hatte, etwa vor 1000 Jahren. Ältere Aufzeichnungen sind nicht bekannt. Demnach handelt es sich hier wohl um einen der ersten Kuben überhaupt, wenn unsere Informationen korrekt sind.“

Nach dem Essen lässt Naomi Annika allein und diese beginnt mit der Analyse der Untersuchungen und Scanns. Nach einiger Zeit wird ihr langweilig, weil sie keine zwingend neuen Erkenntnisse gewinnen kann. Bemerkenswert ist nur die Tatsache, dass bisher kein Lebenszeichen entdeckt wurde. Da aktiviert sie den mobilen Emitter des Doktors. Er soll sich die biometrischen Signale näher ansehen, vielleicht gibt es da etwas zu finden. Der Doktor ist froh, endlich eine Aufgabe zu bekommen, bei seiner Arbeit beginnt er, ein Lied zu singen. Annika erinnert sich daran und fällt mit ein. Der Gesang ist schön und klar und sorgt für Ruhe im Denken und gemeinsam ist das Arbeiten mit all den Daten einfach angenehmer. Nach etwa 3 Stunden sind sie durch, ohne zwingend neue Erkenntnisse gewonnen zu haben und Annika will schlafen. Der Doktor bittet sie aber, noch etwas wach zu bleiben. Gemeinsam gehen sie in den Hangar, wo Paris` Schiff steht. Sie öffnen es und der Doktor holt eine kleine Schachtel heraus. „Was ist das?“, fragt Annika. Vorsichtig öffnet der Doktor die Schachtel, die eine kleine Ampulle enthält. Er nimmt sie in die Hand und hält sie zwischen Daumen und Zeigefinger geklemmt Annika vor die Augen. „Diese Ampulle enthält Nanosonden, diese waren die ersten, die ich bei dir entnommen habe, Sie ruhen derzeit, durch Injektion werden sie wieder aktiviert. Da du deinen Alkoven nicht hier hast, dachte ich, sie könnten vielleicht wichtig sein. Ich habe sie in Toms Schiff schmuggeln lassen, das war eine Kleinigkeit.“

Annika denkt kurz nach, und entscheidet sich dafür, die Ampulle an sich zu nehmen, für den Fall, dass sie sie brauchen würde.

„Das ist meine brave Seven“, meint der Doktor und wünscht ihr eine gute Nacht, woraufhin er sich selbst deaktiviert. Annika geht zurück in ihr Quartier und legt sich schlafen.

Am nächsten Morgen treffen sie sich auf der Brücke, um zusammen mit Captain Barnhood das weitere Vorgehen zu planen.

Alle werden mit Einzeltransportern ausgestattet, des weiteren mit schnell modulierenden Hirogen-Plasmablastern. Die Tricoder sind mit einem externen Rechner der „Andromeda“ verbunden.

Sie öffnen alle Kisten in diesem Raum und untersuchen das darin befindliche Material, meist handelt es sich um Ersatzteile und Rohstoffe, aber nichts wertvolles.

„Wir nehmen ein paar Proben mit und machen Schluss für heute“, befiehlt Naomi, die den höchsten Rang inne hat.

Auf der „Andromeda“ führen sie einige Tests durch und kommen zu dem Schluss, dass das Schiff oder zumindest das mitgebrachte Material wohl 972 Jahre alt sein muss. Nach all der Zeit ist kein biologisches Material mehr auffindbar.Wie lange der Kubus bereits unterwegs ist, lässt sich nicht feststellen.

Am nächsten Tag beamen sie in denselben Raum, öffnen das Schott zu einem weiteren Lager, welches ebenfalls fast leer ist. Heute beschränken sie sich auf wenige Kisten, die sie nur kurz öffnen und den Inhalt scannen und katalogisieren. Gleich danach gelangen sie in die Rechenzentrale im Zentrum des Kubus. Hier liegen tote Borg, oder vielmehr das, was nach sehr langer Zeit davon übrig bleibt. Der Computer arbeitet selbständig, aber irgend etwas stimmt nicht. Das Team untersucht den Rechner und kopiert Dateien. Bei einer ersten Durchsicht stellt Annika fest, dass der Kubus seit einer vor langer Zeit stattgefundenen Landung keine Aufzeichnungen über weitere Aktivitäten gemacht hat. Eventuell liegt ein Defekt vor, oder man will verhindern, dass Rückschlüsse auf das Reiseziel gezogen werden können.

Auch ein Borg-Schiff muss ständig gewartet werden. Aber wer erledigt das, wenn alle Borg tot sind?

Dieses Rätsel beschäftigt das ganze Team und je mehr sie forschen und untersuchen, desto sicherer sind sie sich, dass sie nicht allein sind.

Dann führt der Weg in einen Hangar, in dem eine Kapsel steht. Sie ist verschlossen und Annika versucht, diese zu öffnen. Sie gleicht entfernt den Alkoven der Borg, hat aber einen durchsichtigen Deckel.

Offenbar ist keine Energie mehr vorhanden, denn nirgends findet sich ein Eingabefeld. Scanns zeigen, dass es sich um eine Art Stasis-Kapsel handelt. In ihr finden sie einen lebenden Borg, der derzeit schläft. Der spezielle Deckel verbarg das Lebenszeichen des Borg, deshalb blieb er bei den Scanns unentdeckt.

Die Sicherheitsleute richten sofort ihre Waffen darauf, aber Annika stellt sich vor die Kapsel. „Wir werden erst untersuchen. Ich weiß euren Eifer zu schätzen, aber hier haben wir wohl des Rätsels Lösung. Diese Drohne zu töten, macht all unsere bisherigen Bemühungen nutzlos.“ Der Doktor scannt die Kapsel und kommt zu dem Schluss, dass sie wohl alle 6 Wochen den Borg weckt, damit er einige Arbeiten ausführen kann, um dann wieder 6 Wochen zu schlafen.

Die Bauweise ähnelt den Alkoven der Borg. „Vielleicht ist dies ein früheres Modell.“, meint er. Laut den Anzeigen sollte der Borg noch 3 Tage schlafen, bis er automatisch wieder geweckt wird.

„Diese Stasis-Kapsel entspricht keiner mir bekannten Borg-Technologie, sie enthält zwar Komponenten, aber der Großteil kommt von einer anderen Kultur.“, bemerkt Annika.

Captain Barnhood lädt das Team zu einer Besprechung und schnell wird klar, dass die Aufgabe umfangreicher wird, als alle angenommen haben. Die Andromeda ist nur ein Forschungsschiff, aber falls es auf dieser Mission zu Schwierigkeiten kommen sollte, wäre Hilfe mehr als erwünscht. „Gut, wir werden die nächsten 3 Tage den Kubus vollständig untersuchen, wir brauchen mehr Leute dafür. Ich werde bei der Sternenflotte ein größeres Schiff anfordern, vielleicht die Columbia 2, die ganz in der Nähe ist.“

Am nächsten Tag gelingt es, ein Computerterminal im Maschinenraum in Betrieb zu nehmen. Annika spielt die Daten auf ihren Tricoder, leider enthalten sie aber keine taktischen oder historischen Hinweise.

Interessiert schaut sich das Team im Maschinenraum des Kubus um, fast alles ist noch funktionstüchtig. Annika will versuchen, die Kontrolle über die Steuerung des Kubus zu erlangen, aber Naomi hält sie davon ab.

„Wir wissen nicht, wer oder was dieses Schiff steuert. Wenn du etwas änderst, könnte dieses etwas merken, dass wir hier sind. Vielleicht wird der schlafende Borg dann zu früh geweckt.“ Das leuchtet ein.

Stattdessen kopiert Annika das Programm der Konsole, um dann in Ruhe die Befehlsstruktur studieren zu können. Vielleicht verschafft diese Kenntnis einen strategischen Vorteil.

Im Maschinenraum finden sich auch verstreute Borg-Implantate, Teile von Körpern. Den biologischen Komponenten beraubt, sehen sie fast gespenstisch aus.

„Zerfallene Drohnen“, kommentiert der Doktor trocken und nimmt ein paar Teile an sich.

„Ich bin gespannt, in welchem technologischen Stadium sich die hier befinden. Durch Vergleiche mit heutigen Implantaten kann ich Rückschlüsse auf die Entwicklungsgeschwindigkeit der Borg ziehen. Vielleicht kommen wir so dem Rätsel näher. Insgesamt erkenne ich neun Individuen in diesem Kubus.“ Da es seitens Naomi keine Einwände gibt, ist ihm wohl diese Forschung erlaubt.

Die Columbia 2 trifft ein und Captain Barnhood erhält eine Nachricht von der Sternenflotte. Admiral Janeway spricht persönlich mit ihm.

Der Captain ist gar nicht begeistert, als er erfährt, dass er das Kommando über diese Mission an einen anderen abgeben soll. Janeway erklärt den Grund für diese Maßnahme: „Wenn zu viele Schiffe von uns zusammen sind, zieht das wahrscheinlich das Interesse der Romulaner auf uns. Wir wollen diese Forschung aber möglichst ohne Störung von außen durchführen. Einen Konflikt können wir derzeit nicht riskieren. Janeway Ende.“ Die Entscheidung ist gefallen. Eigentlich wollte er die Forschung weiterhin leiten, aber 2 Schiffe auf einmal konnten nicht an der Sache arbeiten. Deshalb fliegt er wieder davon, um seine ursprüngliche Mission fortzusetzen. Das Team, das bisher zusammen gearbeitet hatte, darf den Dienst auf der Columbia 2 antreten. Die Columbia 2 ist ein richtiger Sternenkreuzer der Intrepid-Klasse
und im Ernstfall dem Kubus weit überlegen. Es handelt sich fast um ein Zwillingsschiff der Voyager, ist aber aber wesentlich moderner, mit mehr Decks und 3 statt 2 Warpgondeln. Befehligt wird es von Captain Harry Kim. Nun sind 5 ehemalige Crewmitglieder der Voyager an diesem Unternehmen beteiligt.

„Ich freue mich, euch alle auf meinem Schiff begrüßen zu dürfen. Da haben wir ja was recht hübsches aufgegabelt oder? Lasst uns mal sehen, was wir da haben.“

Nacheinander bringen die Teilnehmer der Mission ihre bisherigen Ergebnisse und Vermutungen zum Vortrag, der Monolog von Annika wird am ausführlichsten.

„Also gut. Wir werden warten, bis der Borg erwacht. Ich schlage vor, dass zu diesem Zeitpunkt der Doktor an Bord des Kubus sein wird, da er kaum einer Gefahr ausgesetzt sein dürfte. Wir dürfen nicht vergessen, dass dieser Borg unsere Rasse vielleicht nicht kennt, auch wissen wir noch nichts über seine Absichten.“

Die Tage vergehen, die Mannschaft wird auf mögliche Borg-Angriffe trainiert, der Suchradius erweitert. Doch es gibt keine weitere Borg-Aktivität.

Der Doktor wird in den Kubus gebeamt.

Vollautomatisch aktiviert sich die Stasis-Kapsel. Langsam öffnet sich der durchsichtige Deckel. Die Beleuchtung im Raum steigt um einige Stufen.

Wie ein Vampir aus einem Horrorfilm erhebt sich der Borg von seinem Sarkophag.

Er blickt sich um, der Doktor kann den roten Suchstrahl gut sehen.

Dann entsteigt er völlig der Kapsel und begibt sich zur Konsole, um den Zustand der Kapsel abzufragen. Der Borg ist recht klein, nur etwa einen Meter fünfzig. Offensichtlich zufrieden begibt er sich in den Maschinenraum direkt nebenan.

Der Doktor zeichnet alles auf, damit die anderen auf der Columbia 2 später die Handlungen besser nachvollziehen können. Es handelt sich zwar um einen Borg, aber was der Unterschied zu heutigen ist, ist noch nicht erkennbar.

Im Maschinenraum kontrolliert der Borg einzelne Anzeigen, nimmt kleine Reparaturen und Anpassungen vor. Es wirkt alles so gespenstisch. Ein biologisches Wesen, mit einigen Borg-Implantaten. Der Doktor versucht, die ursprüngliche Spezies auszumachen, aber genau kann er sie nicht bestimmen. Die Föderation hat schon sehr viele verschiedene Spezies gefunden und katalogisiert, aber da gibt es auch viele, die sich in bestimmten Punkten gleichen, aber dennoch aus unterschiedlichen Regionen stammen. Nach etwa 4 Stunden geht der Borg in Richtung Frachtraum. Dort bemerkt er, dass einige Kisten geöffnet wurden. Rasch kehrt er in den Maschinenraum zurück, aktiviert die internen Sensoren und entdeckt so den Doktor.

„Wer sind sie? Was machen sie hier? Dies ist ein Schiff der Borg, Eindringlinge sind nicht willkommen.“

Es dauert eine Weile, bis der automatische Übersetzer die Sprache des Borg analysiert und einen Übersetzungsalgorithmus erstellt hat. Dies bestätigt den Doktor in seiner Annahme, dass der Borg keiner bekannten Spezies angehört.

„Entschuldigen sie mein Eindringen, aber ich bin Forscher und fand diesen Kubus und wollte ihn untersuchen.“

„Ich glaube vielmehr, sie wollen Technologie stehlen, jeder weiß, dass die Borg über außergewöhnliche Technologie verfügen.“, erwidert der Borg.

„Ihr Schiff ist nicht mehr voll einsatzbereit“, meint der Doktor. „Für Spezies dieses Quadranten wäre es ein leichtes, ihn zu zerstören.“

„Warum sollte jemand das Schiff eines friedlichen Volkes zerstören wollen?“

Diese Worte überraschen den Doktor. „Der Kubus verteidigt sich nur von selbst, so, wie vor einigen Tagen, wie ich den Anzeigen entnehmen konnte.“

„Sie meinen den Torpedo?“ „Ja, irgend ein Objekt flog abgeschossen knapp an uns vorbei.“

„Haben Sie nicht nach der Ursache gesucht?“ „Keine Zeit, wir müssen unser Ziel erreichen.“

„Was ist das Ziel, vielleicht kann ich helfen?“

„Das ist geheim“, lautet die Antwort.

„Bitte verlassen sie diesen Kubus und kommen sie nicht wieder.“

Mit seinem Transporter beamt sich der Doktor wieder auf die Columbia 2.

Dort spielt er im Holodeck den anderen die Aufzeichnung vor. Mit dem Holodeck kann man das Geschehene so simulieren, als wäre man selbst dabei.

„Was fällt am meisten auf?“, Harrys Frage schwebt durch den Raum.

„Kein „Wir sind die Borg, sie werden assimiliert werden. Widerstand ist zwecklos.“ Naomi hat es erkannt.

„Der Borg sieht sich als Forscher, der zu einem bestimmten Ziel unterwegs ist. Vielleicht waren alle Borg früher Forscher und irgend etwas hat den Forscherdrang durch den Drang zu Erobern ersetzt.“ „Die Assimilation ist ja auch irgendwie Forschung, nur eben aggressiver“, entgegnet Annika.

„Das ist richtig, aber dieser Borg wirkt in keinster Weise aggressiv.“

„Vielleicht weil er allein und alt ist.“, sagt Naomi.

„Wir werden sehen. Am besten, wir warten ab, bis der Borg wieder schläft.

Ist nur die Frage, wie wir das herausfinden.“

„Mit einem frechen Grinsen im Gesicht betätigt der Doktor einige Schaltflächen an der Konsole und es erscheint ein live-Bild vom Kubus vor ihren Augen.

„Tada!“, macht er.

„Super Idee, Doc“, lobt Harry.

„Jetzt bleibt nur die Frage, was wir weiter unternehmen werden. Wenn er wieder in Stase ist, kann er uns keine Informationen geben. Außerdem hat er die internen Sensoren angelassen. Ich wette, wenn wir wieder in den Kubus beamen, gibt es unerfreulichen Alarm und er dürfte uns doch angreifen. Er wäre zwar keine Gefahr für uns, doch ihn zu beschädigen könnte all unsere Hoffnung zerstören. Ich will, dass er freiwillig mitarbeitet.“

Am Abend kommt der Doktor wieder zu Annika. Er bringt auch eine geniale Idee mit.

„Wie wäre es, wenn wir dich wieder in eine Drohne verwandeln?“

Entsetzt starrt Annika ihn an. „Nein, nur äußerlich. Wir könnten dich wieder in eine Drohne verwandeln mithilfe der Replikatoren. Ich frage Harry, ob er noch alte Holo-Aufzeichnungen von der Voyager dabei hat.“

„Ich dachte schon, du willst die Nanosonden einsetzen, um mich wieder zu einem Borg zu machen.“

„Rein theoretisch ginge das, aber da würde ich die viele Arbeit, die ich in Seven gesteckt habe, um sie wieder zu Annika Hansen zu machen, vernichten.“

Darauf geht er zu Harry, um ihn von seiner Idee zu berichten.

Dieser zeigt sich sehr begeistert und hat auch gleich eine Lösung parat.

„Ja klar, Tom und ich haben tagelang an dem Programm gebastelt und noch viel mehr Zeit damit zugebracht, uns damit zu amüsieren. Die Idee ist wirklich gut. Annika könnte als Borg verkleidet Kontakt zu unserem Freund aufnehmen. Am besten, wir probieren das Programm gleich mal aus, ob wir was passendes finden.“

Unterwegs zum Holodeck treffen sie auf Tom, der sofort bereit ist, mit zu spielen.

Das Programm erinnert sie stark an die Voyager.

In der gewählten Szene betrat Seven vollständig als Borg die Brücke der Voyager und meinte, sie würden alle assimiliert werden. Dann begann sie, den Brustpanzer zu öffnen. Schnell ruft Harry „STOPP!“ und Tom erinnert sich, warum er das sagte. Nur der Doktor schaut etwas verwirrt. „Was soll das?“, fragt er. „Was jetzt kommt, wollen Sie bestimmt nicht sehen.“ „Zu brutal?“, fragt der Doktor. „Nein, eindeutig zu indiskret.“

„Wieso?“ „Nun, auf dieser sehr, sehr langen Reise gab es nicht viele Möglichkeiten, und da haben wir dieses Programm sehr an männliche Bedürfnisse angepasst.“

„Sie meinen, Seven zieht jetzt blank?“ „Ja, so ist es“, gibt Tom kleinlaut zu. „Das muss ihnen nicht peinlich sein, aber für unsere Zwecke benötigen wir das nicht. Wir müssen die ganzen Borg-Implantate kopieren und so herstellen, dass sie echt wirken.“

„Ja, das machen wir.“

Sie kopieren jedes Implantat von Sevens Körper und transferieren die Daten zu einem Replikator. Dieser stellt die Teile nun her, aber es ist ihm nicht möglich, sie mit all den Lämpchen und Geräuschen perfekt zu imitieren.

Dies stellt aber für Harry kein Problem dar. „Ich habe da jemanden auf dem Schiff, der kriegt das bestimmt hin.“

Sie gehen zu einer Kabine und betätigten den Summer. „Fähnrich Gir Zorkan“, meldet die Computerstimme.

Die Tür öffnet sich und ein junger Vulkanier begrüßt die Gäste.

„Gir, wir brauchen deine Fähigkeiten“, beginnt Harry. „Nicht schon wieder Lampen wechseln an der Außenhülle“, stöhnt Gir.

„
Nein, wir brauchen dein wahres Talent“, beruhigt er ihn.

Es dauert einige Tage, aber das Ergebnis kann sich sehen lassen.

Annika probiert die Teile an und im Handumdrehen sieht sie genauso aus, wie sie das erste Mal die Voyager betrat.

„Und, was sagen Sie?“, fragt der Doktor mit einem strahlenden Grinsen zu Harry.

„Perfekt, hoffentlich fällt unser Freund auch darauf herein.“

„Das werden wir bald sehen, der Computer meldet, dass die Stasis-Kapsel in den Weck-Modus geht.“

„Das sollte doch erst in einigen Tagen geschehen.“

„Brücke, scannen Sie das ganze Gebiet, gelber Alarm“

Sie begeben sich zur Brücke, um schneller mit Informationen versorgt zu werden. Auf dem großen Bildschirm sehen sie, wie der Kubus damit beginnt,ein Wurmloch zu erzeugen. In wenigen Minuten würde es groß genug sein, um hindurch zu fliegen. „Wo führt es hin?“,fragt Harry. „In den Delta-Quadranten.“ Nicht schon wieder!“, stöhnt Tom, der schon das Schlimmste befürchtet. „Jetzt haben wir die Wahl und wir sollten uns schnell entscheiden. Entweder bleiben wir hier und lassen den Kubus ziehen, oder wir folgen ihm.Wenn uns dieser Kubus in den Delta-Quadranten bringen kann, dann wahrscheinlich auch wieder zurück.“ Harry ist sich der Tragweite dieser Entscheidung bewusst und möchte nicht, dass er selbst eine trifft, die allen anderen Beteiligten missfällt.

Tom witzelt:“Dann sollten wir ihn wie ein rohes Ei behandeln. Also los, riskieren wir es!“ Alle auf der Brücke nicken zustimmend.

Der Kubus fliegt in das Wurmloch und die Columbia 2 folgt ihm.

Die Reise dauert nur wenige Tage die Columbia 2 blieb in sicherem Abstand, der Kubus schien sie nicht weiter zu beachten.

Schließlich erreichen sie das Ende des Wurmlochs. „Positionsbestimmung“, fordert Harry. „Auf jeden Fall sind wir mitten im Delta-Quadranten, nicht weit vom Borg-Gebiet.“ „Na schön, folgen wir weiter dem Kubus.“

Nach einiger Zeit meldet sich der dienst habende Brückenoffizier:“Hier Brücke. Wir haben einen Klasse-M-Planeten gefunden. Er ist bisher nicht erfasst. Der Kubus ist unter Warp gegangen und nähert sich dem Planeten.“ „Folgen Sie ihm“, befahl Harry.

„Schon erledigt, ich habe mir schon gedacht, dass Sie das wünschen. Wir sind in einem Nebel praktisch unsichtbar.“ „Gut, scannen Sie weiter.“ Zu den anderen gewandt erklärt Harry: “Wir müssen unseren Plan etwas abändern, warten wir erst einmal ab, was sich so ergibt.“

„Sir, wir empfangen ein Audio-Signal von dem Kubus.“ „Ist es an uns gerichtet?“ „Nein, es ist auf den Planeten gerichtet.“

„Was ist das für ein Planet?“, wollte Harry wissen. Die Scanns sind fast komplett, lautet die Antwort.

Einige Minuten später folgt der Bericht des Wissenschaftsoffiziers.

Demnach handelt es sich um einen gewöhnlichen Klasse-M-Planeten. Offenbar ist er derzeit unbewohnt, zumindest sind keine keine humanoiden Lebensformen auszumachen. Aber offenbar war er einmal bewohnt, es gibt Reste von Zivilisationen, Städte, Verkehrswege und dergleichen. Den genauen Zustand müsste man aber vor Ort klären.

„Am besten wird sein, wenn wir uns den Planeten mal näher anschauen. Das Audio-Signal, wie lautet die Botschaft? Gibt es Antwort?“, fragt Harry.

„Die Botschaft ist einfach: „Elidra, ich bin hier.“ Interessant ist die Sprache. Es ist el-aurianisch.“

„Was haben die el-Aurianer mit den Borg zu tun? Soweit wir wissen, wurden die el-Aurianer von den Borg vernichtet. Und wer oder was ist Elidra?“ fragt Tom. „Noch ein Grund mehr, uns die Sache näher anzuschauen.“ erwidert Harry. „Wir bilden ein Außenteam. Solange der Borg in seinem Kubus bleibt, sollten wir so viele Informationen wie möglich sammeln. Offenbar sind seine Bio-Scanns nicht so gut, sonst hätte er doch auch sehen müssen, dass dort unten keine Humanoiden sind. Vielleicht bleiben wir so unentdeckt. Halten Sie zur Sicherheit den Kubus mit dem Phaser erfasst, falls er uns auszutricksen versucht.“

Mit einem Außenteam beamen sie auf den Planeten. Die Scanns bewahrheiten sich, sie finden eine leere Stadt vor, es ist, als hätten die Bewohner den Planeten urplötzlich verlassen. Bemerkenswert ist, dass auch keinerlei Tiere zu sehen oder zu hören sind. Nur Pflanzen gibt es, die die Reste der Zivilisation zu verschlingen scheinen. Es ist unmöglich, den ganzen Planeten auf diese Weise zu erkunden. Also kehren sie wieder auf die Columbia 2 zurück.

Der Bericht fällt entsprechend knapp aus.

„Da der Borg anscheinend in seinem Kubus bleibt und wir keinen Anhaltspunkt finden können, warum er hier ist und was er vor hat, bleibt uns wohl nichts anderes übrig, als direkten Kontakt mit ihm herzustellen.“ Harry hat es auf den Punkt gebracht.

Annika arbeitete während des Fluges an den Daten, die sie aus dem Kubus mitgebracht haben.

Mit dem Doktor spricht sie darüber. „Es gibt eine Art Logbuch, sogar mit Skizzen und Videoaufnahmen.“ „Ein Tagebuch“, ergänzt der Doktor. „Aber fahren sie fort.“

„So wie es aussieht, ist Elidra wohl die Mutter aller Borg und hier drin ist ihre Geschichte.“ Dabei deutete sie auf ihren Computer. „Das ist interessant, aber in wieweit sollte uns das nützen, wie können wir das verwenden?“

„Vielleicht gelingt es mir, eine komplette Geschichte daraus zu machen, und dem Borg unsere Kenntnisse zu vermitteln.“ „Wie?“, fragt der Doktor neugierig. „Ich beame in den Kubus und rede mit ihm. In dem Borg-Kostüm wirke ich vielleicht nicht so bedrohlich für ihn.“ „Ja, das könnte funktionieren“, erwidert der Doktor lächelnd. Annika rematerialisiert im Lagerraum des Kubus, in dem sie immer mit ihren Untersuchungen begonnen hatten. Sie blickt sich um, aber es ist niemand zu sehen. Sie begibt sich auf die Suche nach dem Borg. Annika findet ihn im Maschinenraum. “Ihr sollt von dem Kubus fernbleiben, habe ich gesagt,“ Der Borg dreht sich um und Annika sieht in ein entsetztes Gesicht. Schnell läuft er davon. Ein Schott schließt sich hinter ihm. Annika folgt. Gerade als sie ebenfalls durch das Schott tritt,wird sie von einer Strahlenwaffe getroffen.

Auf der Brücke wurde diese Energieentladung registriert. „Annika, bitte melden!“ Aber sie meldet sich nicht.“Beamen sie sie sofort auf die Krankenstation!“

Augenblicke später befindet sich Annika in der Krankenstation, der Doktor steht neben ihr.

„Was war los?“ „Er hat ohne Grund und Vorwarnung auf mich geschossen. „Zum Glück hattest du diesen Anzug an. Er ist in der Lage, eine Menge Energie zu absorbieren. Den Messungen zu folge wärst du sonst tot.“ Wem habe ich denn dieses Wunder zu verdanken?“, fragte sie neugierig. „Das Material stammt von Naomi. Sie hat die Daten in den Replikator eingegeben. Da es kein richtiger Borg-Anzug ist, hat er auch nicht den Schutzschild der Borg. “ „Richten sie ihr meinen Dank aus.“ sagte sie in ihrem typisch sachlich ernstem Ton. „Ich muss wieder an die Arbeit.“

„Jetzt ruhen sie sich wenigstens mal einen Tag aus, sie wären fast gestorben.“ „Nun, dann lassen sie mich wenigstens an dem Logbuch weiterarbeiten. Das kann ich auch hier tun.“ Der Doktor gestattet es.

Schon bald ist sie fertig.“Ich habe hier etwas nettes für unseren Freund“. „Was ist es?“, fragt der Doktor.

„Ich habe meine schöne kleine Geschichte fertig gestellt. Sie wird den Borg wohl doch dazu bewegen, mit uns zu reden.“

„Du hast einen Plan,oder?“ Tom kommt mit diesen Worten in die Krankenstation. „Wie willst du dem Borg diese Geschichte erzählen? Dort hinüber können wir jedenfalls nicht mehr. Dich mag er wohl nicht besonders. Offenbar war er es, der die anderen Borg im Kubus erledigt hat. Die Frage lautet nur, warum.“ „Falls meine Vermutungen richtig sind, wird meine Geschichte alles erklären.“ , erwidert Annika. „Wie möchtest du sie ihm erzählen?“, fragt der Doktor.

„Ebenfalls mit einem Audiosignal, das wirkt nicht so aggressiv und wenn die Geschichte stimmt, wird er antworten.“

Da das Logbuch nicht alle Ereignisse enthielt und Lücken aufwies, benötigte Annika ihr logisches Denken, um alles zu einem Ganzen zusammen zu fügen. Sie präsentiert ihre Geschichte ihren Kameraden. Die waren sehr erstaunt und Harry zeigt sich begeistert von der Idee mit der Audioübertragung. Annikas Kenntnisse über die Technologie der Borg lassen sie eine Möglichkeit zur Übertragung finden, die der Borg nicht so schnell deaktivieren kann.

Der Borg ist gerade dabei, seine letzten Scann-Ergebnisse durchzusehen, als er aus Lautsprechern eine Stimme hört:

2. Kapitel:

Elidra war gerade rechtzeitig aufgestanden, um mit ihrer Schicht zu beginnen. Es fiel ihr öfters schwer, aufzustehen, besonders, wenn sie eine 10-Stunden-Schicht vor sich hatte.

Das Frühstück fiel wie immer spärlich aus.

Elidra zog sich schnell ihren Schutzanzug an. Beim Anziehen der Stiefel passierte das Missgeschick: Mit Barf (brotähnliches Gebäck) zwischen den Zähnen stolperte sie und fiel nach vorn auf ihr Gesicht. Durch den Aufprall auf dem harten Boden brach sie sich den linken Arm.

„Auch das noch...“,fluchte sie laut und bemühte sich anzuziehen. Das dauerte aber einige Zeit, da sie nur noch den rechten Arm benutzen konnte. Statt zum Arbeitsplatz musste sie nun in die Krankenstation gehen. Diese lag genau in der entgegen gesetzten Richtung der Basis. Die Basis wiederum liegt unter einer halben Kuppel aus Glas. Gestützt wird sie durch Metallstreben, die vom Boden aus an der Felswand zusammen laufen. Die meisten Gebäude sind über dem Boden, aber alle Zugänge befinden sich unterirdisch, genau wie die Mine und die Vorratskammer. Die Krankenstation steht genau über der Vorratskammer und ist durch ein Kraftfeld geschützt, um im Ernstfall einen sicheren Schutz bieten zu können.

Nach ein paar Minute war sie da. In ihrem Helm erklang eine Stimme: “Subkommander Elidra, wo bleiben Sie? Ihre Schicht hat schon angefangen!“ Im Visier sah sie zudem die verärgerte Fratze ihres Vorgesetzten.

„Ich bin in der Krankenstation. Wenn ich gleich behandelt werde, bin ich in einer halben Stunde bei Ihnen.“ „Das will ich hoffen.“ Er drehte sich schnell um. „Was ist da los? Seid ihr zu blöde...“ Eine riesige Explosion dröhnte durch Elidras Helm, der Lärm ließ sie ohnmächtig werden.

Als sie wieder erwachte, dauerte es etwas, bis sie wieder wusste, wo sie sich befand. Die Notbeleuchtung war eingeschaltet. Die Krankenstation befand sich unter der Oberfläche, oben waren Lagerräume und Werkstätten.

Der linke Arm schmerzte. Elidra versuchte, über das Interface ihres Helms Kontakt zu anderen aufzunehmen, was aber nicht gelang.

Entweder war der Helm defekt, oder es war einfach niemand mehr da…

Elidra tappte weiter durch den Gang zurück zum Lift. Dort stellte sie fest, dass dieser außer Betrieb war. Auch der Tunnel nach draußen war durch ein Schott verschlossen. Es gab zwar mehrere dieser Ausgänge, aber die sind bestimmt auch zu, dachte sich Elidra.

Also ging sie wieder zurück. Sie versuchte, jemanden zu finden, der hier arbeitete, aber sie fand niemanden. Irgend jemand musste doch hier sein und sich auch ihren Arm anschauen und heilen. Vorsichtig tappte sie weiter. Noch nie war sie hier gewesen, obwohl sie schon 3 Jahre hier in dieser Basis arbeitete. Sie war eben noch nie krank gewesen. Überhaupt kannte sie niemanden, der je krank gewesen sei, Verletzungen aber nicht inbegriffen. Aber irgendwie mussten solche Verletzungen doch auch behandelt werden, oder? Sie war mit ihren 35 Jahren sehr jung und da sie zudem äußerst attraktiv war, konnte sie sich den Annäherungsversuchen der männlichen Kollegen kaum erwehren. Man hatte ihr abgeraten, im Dilizium-Abbau zu arbeiten, aber seit dem Tod ihrer Eltern hielt sie nichts mehr auf el-Aurian.

Sie beschloss, der Beschilderung zu folgen. Warum sie nicht eher darauf gekommen war, wusste sie selbst nicht, aber das kann auch von der Ohnmacht und dem Schreck herkommen.

So fand sie einen Raum, auf dem „Behandlungsraum“ stand. Sie öffnete die Tür. In dem Raum war keine Beleuchtung, also schaltete sie ihre Helmlampe ein. Der Raum wirkte leer, in der Mitte war eine Art Tisch, auf dem ein länglicher Behälter lag.

Er war etwas mehr als mannslang und der Deckel war durchsichtig. Langsam näherte sich Elidra dem Tisch und leuchtete in den Alkoven.

Vor Schreck wäre sie fast nach hinten umgefallen. So etwas hatte sie noch nie gesehen. Vorsichtig öffnete sie den Deckel und da lag ein Mann darin. Seine Haut war völlig verbrannt und er war tot.

Elidra hörte, wie etwas in den Raum kam. Blitzschnell drehte sie sich um, aber da kam nur ein kleiner Roboter herein. Er war weiß und nur etwa einen Meter groß.

„Sie müssen warten, bis der Patient da wieder genesen ist.“ Die Stimme klang klar, aber der Roboter besaß keinen Mund oder irgendeine Nachbildung eines solchen.

„Das dürfte eine Ewigkeit dauern, bis der hier“ und sie deutete auf den Leichnam, „wieder aufsteht.“

„Ich verstehe nicht.“, war die Antwort. „Der Mann hier ist tot, gestorben.“ „Ich verstehe nicht.“

Elidra versuchte es anders: „Der Mann hier drin ist kaputt, irreparabel geschädigt.“

„Das verstehe ich nicht.“ „Warum verstehst du das nicht?“

„Mann geht rein. Wenn diese Lampe grün leuchtet, Mann geht wieder heraus.“

„Das war noch nie anders?“, fragte sie.

„Nein, das ist immer so.“ „Benenne deine Funktion!“, befahl sie.

„Ich überwache die Heilungen.“ „Wie genau machst du das? Demonstriere!“, sagte sie.

Sie ging zur Seite, um dem Roboter Platz zu machen. Dieser ging auf den Alkoven zu, eine Art Sensorgreifer wurde von einem Arm ausgeklinkt und glitt in eine entsprechende Öffnung an dem Kasten. „Es sind keine Daten zu empfangen“, sagte er ruhig. „Wieso sind keine Daten zu empfangen?“, fragte Elidra. „Das weiß ich nicht.“ „Was weißt du überhaupt?“, fragte sie langsam genervt.

„Mann geht rein. Wenn diese Lampe grün leuchtet, Mann geht wieder heraus. Zwischendurch Daten entnehmen und in Computer eingeben.“ „Funktioniert der Computer noch?“, wollte sie wissen. Vielleicht bekam sie dort Informationen. Aus dem Roboter war nichts mehr herauszuholen.

„Führe mich hin.“, sagte sie schroff. Es nervte sie, wenn sie nicht weiter kam. Ohne eine Antwort schritt der Roboter aus dem Raum. Elidra folgte ihm durch spärlich beleuchtete Gänge. Diese waren schmal und seitlich gingen einige Türen ab.

Schließlich betraten sie einen Raum, in der ein Computer stand. Sie kannte sich damit aus, überall in der Station waren solche Computer und auch die Unterkünfte waren damit ausgestattet.

Aber dieser hier war leider aus. Offenbar hatte er keine Energie. Sie überlegte eine Weile. Sie verließ den Raum wieder und deutete dem Roboter mitzukommen.

Sie suchte nach einem Lagerraum. Es wäre sicherlich sinnlos gewesen, den Roboter danach zu fragen. Nach ungefähr einer Stunde hat sie einen solchen Raum gefunden, denn von den vier Wegen nach oben waren drei versperrt. Dort nahm sie einige Energiezellen,einige Kabel und Werkzeuge.

Dann marschierte sie wieder zurück zu dem Raum, in dem der Computer war. Mit dem Werkzeug öffnete sie diesen und baute innerhalb weniger Minuten die benötigten Energiezellen ein. Ohne die Verkleidung wieder anzubringen, schaltete sie ihn ein.

„Kannst du mir die Daten des letzten Patienten anzeigen?“, fragte sie den Roboter. „Natürlich.“

Der Roboter führte wieder seinen Sensorgreifer in das Gerät und nach wenigen Augenblicken erschienen alle erfassten Daten des Verstorbenen. Es dauerte etwas, bis Elidra die Daten entschlüsselte und das fand, womit sie etwas anfangen konnte. Schließlich war sie Ingenieurin und keine Ärztin.

Offenbar war der Patient einer hoch energetischen Strahlung ausgesetzt gewesen, deshalb war seine Haut verbrannt, aber er hätte wohl überlebt, denn er befand sich bereits auf dem Wege der Besserung. Nur die letzten Daten fehlten. Vielleicht, so überlegte sie, könnte man die Daten auslesen, wenn man den Alkoven reaktivierte.

So gingen sie mitsamt den verbliebenen Energiezellen und dem Werkzeug wieder zu dem Raum, wo der Alkoven stand.

Zuerst hob sie den Leichnam unter Protest des Roboters aus der Kiste, um diese öffnen zu können.

„
Hast du eine Video- Aufnahme-Funktion?“, fragte sie. Der Roboter bestätigte, wollte aber wissen, wofür sie diese benötigte. „Falls ich das Ding selber mal brauche, und das werde ich, wegen meinem gebrochenen Arm. Da muss ich das Teil wieder voll funktionstüchtig zusammen setzen. Beginne jetzt mit der Aufnahme.“ Elidra erläuterte jeden Schritt, den sie tat, die Aufgabe war etwas schwieriger, als das Reparieren eines banalen Computers und sie war sich sicher, dass sie ohne diese Aufzeichnung dieses Teil kaum würde wieder zusammen setzen können.

„Lass uns die Daten in den Computer übertragen.“ „Wollen Sie den Alkoven nicht erst wieder reparieren?“ Plötzlich war er ja richtig geschwätzig, fand Elidra.

„Nein, ich muss erst wissen, was hier passiert ist, danach sehen wir weiter.“ „Dann sind wir jetzt ein Team? Wie lautet meine neue Bezeichnung?“ Auf dem Weg zum Computer fragte sie den Roboter: „Gibt es in der Krankenstation noch mehr von deiner Sorte?“ „Ja, hier gibt es noch 4 weitere Roboter, für Reinigungs-Reparatur und Wartungsarbeiten.“ Sie sind derzeit deaktiviert, sie werden nur bei Bedarf aktiviert. Die Aktivierung kann über den Computer vorgenommen werden.“

Auf dem weiteren Weg fiel ihr eine passende Bezeichnung ein: Borg. Zweiter von sechs.

„Wieso Borg?“, fragte der Roboter. „Sie sind el-Aurianerin!“. „Ganz einfach. Wir sind auf dem Planeten Borg und da wir ein Kollektiv sind, sind wir gleich in der Bezeichnung, die Rangfolge ist klar. Weil ich mit den meisten Fähigkeiten ausgestattet bin, bin ich One of six.“

Sie fütterten den Computer mit den neuen Daten und daraus wurde ersichtlich, dass der Mann gestorben war, weil der Alkoven durch die Explosion von der Hauptenergie getrennt wurde und abschaltete. Ohne die Unterstützung des Alkovens hatte der Mann keine Chance zu überleben und starb wohl binnen kürzester Zeit. In der Bauweise des Alkovens war keine separaten Energiezellen vorgesehen, deshalb war es auch so schwierig gewesen, welche einzubauen.

„So, jetzt schauen wir mal, wie es in der Basis aussieht und wie wir hier raus kommen.“

„Darüber habe ich keine Informationen. Ich habe die Krankenstation nie verlassen.“

„Kannst du die Informationen vom Computer übernehmen, wenn ich sie finde?“

„Sicher, nur ob ich sie richtig verwenden kann, weiß ich nicht.“

Elidra überlegte eine Weile, dann sprach sie: „Du kannst dir ja auch die Wege hier drin merken. Wenn ich deine Programmierung anpasse, kannst du die Daten bestimmt verarbeiten. Aber zuerst versuche ich herauszufinden, was hier geschehen ist. Vielleicht ist eine Umprogrammierung gar nicht notwendig. „

Sie durchsuchte die Programmdateien und aktivierte verschiedene Kameras, die überall in der Basis angebracht waren.Nur ein paar wenige funktionierten noch. Die Bilder, die sie sah, zeugten von sehr starker Zerstörung. Die Explosion hatte die Kuppel über der Basis zerstört und die kostbare atembare Atmosphäre war durch giftiges Kohlenmonoxid ersetzt, dem Hauptbestandteil der Planetenatmosphäre. Die Krankenstation hatte eine eigene Abschirmung, weil sie das erste oberirdische Gebäude der Basis war. Das Kraftfeld war scheinbar intakt, denn sonst wäre auch hier das tödliche Gas eingedrungen. Die Kameras im Abbaugebiet waren fast alle zerstört. Niemand hier hat überlebt und spätestens das Eindringen des Todesgases hat wohl alles Leben ausgelöscht.

Die Erkenntnis traf sie wie ein Schlag. Sie war die einzige Überlebende auf diesem Planeten. Es würde noch etwa zwei Monate dauern, bis ein neues Raumschiff kommen würde, um Dilizium-Erz abzuholen und Vorräte zu bringen.

Langsam sank sie auf den Boden und begann verzweifelt zu schreien, was in ein Schluchzen überging, das immer leiser wurde bis sie endlich einschlief.

Nach einigen Stunden erwachte sie wieder. Der Schlaf hatte sie erfrischt, aber ihre Gedanken waren noch immer betrübt und fast wollte sie in tiefster Verzweiflung versinken, als ihr klar wurde, dass sie doch nicht ganz allein war. Nein. Vielmehr hatte sie nun eine wichtige Aufgabe.

Da meldete sich ihr Magen. Sie hatte seit Stunden nichts gegessen oder getrunken.

Scheiß auf die Aufgabe, dachte sie plötzlich. Erst muss ich etwas essen. Mit vollem Magen denkt es sich leichter.

Sie raffte sich auf. „Two of six, gibt es hier noch Vorräte und Wasser?“ „Ja, es ist genügend da und ich weiß auch wo.“

„Aber zuerst aktivieren wir die anderen Roboter. Jede Hilfe ist wichtig.“ Einige Momente am Computer genügten, um die Roboter zu aktivieren, die wenig später bei ihnen eintrafen.

So gingen und sie zusammen hintereinander durch die Station auf der Suche nach den Vorräten, die hier gelagert wurden, weil diese Station am meisten Platz dafür bot. Das Vorratslager befand sich genau unter der Krankenstation. Hier lebten und arbeiteten die ersten Erbauer der Basis. Deshalb gab es hier fast alles, was man so fürs Überleben gebrauchen konnte.

Wenn sie so jemand hätte gehen sehen, wäre das wohl ein lustiges Bild gewesen, die fast zwei Meter große Frau und hinter ihr, wie die sieben Zwerge, die fünf Roboter,die nur halb so groß wie sie waren.

Durch die exakten Angaben von Two of six kamen sie schnell zum Vorratslager.

Dort fanden sie Wasser und Nahrungsmittel, von denen die meisten aber erst zubereitet genießbar waren. Hungrig suchte Elidra einiges zusammen, was roh verzehrt werden konnte.

Dann machte es sich so bequem wie es nur irgendwie ging und begann zu essen. Hastig verschlang sie eine große Menge.

Als sie genug gegessen und getrunken hatte, durchsuchten sie die Vorratskammer, um sich einen Überblick darüber zu verschaffen, was alles noch brauchbar war.

Für sie allein gab es Lebensmittel und Wasser für etwa 4 Jahre, was also mehr als genug war, bis das Versorgungsschiff eintreffen würde. Es gab auch einige Strahlenwaffen und Werkzeuge, sowie verschiedene Baumaterialien.

Aus einigen Stangen, Blechen und Tüchern baute sie sich ein Bett, denn sie war sehr müde. Dann legte sie sich schlafen.

Elidra träumte schlecht. In den Traumbildern sah sie ihre Freunde und Kameraden sterben. Einige zerfetzt von der Explosion, andere qualvoll erstickt.

Trotzdem war sie nach dem Schlaf gut ausgeruht. Sie wusste nicht, wie spät es war, aber es war auch egal. Hier drinnen gab es kein Sonnenlicht und da sie allein war, konnte sie sich die Zeit so einteilen, wie sie es für richtig hielt.

Sie fand auch auch einen kleinen tragbaren Computer, auf dem sie ihre Gedanken auf schrieb um die nächsten Schritte zu planen. Es war schwierig nur mit dem rechten Arm, und da fiel ihr ein, dass sie den anderen erst heilen sollte.

So machte sie sich mit Two of six auf, um die Heilkammer zu reparieren. Dort angekommen, merkte sie, dass das Licht ihrer Helmlampe schwächer wurde.

„So wird das nichts. Wir brauchen mehr Energie. In der Station gibt es einen Reaktor, der auch das Kraftfeld mit Energie versorgt, also sollte es möglich sein, auch alle anderen Systeme damit wieder zu versorgen.“ Also gingen sie zum Reaktorraum. Sie musste nur die von außen kommenden Leitungen abtrennen und mit dem Reaktor neu verbinden, dann hätte sie wieder Energie, denn der Reaktor arbeitete einwandfrei. Nur ein paar Leitungen waren durch ein herab gefallenes Teil der Deckenverkleidung beschädigt und mussten wieder angeschlossen werden.

Das Trennen und Verlängern der Leitungen war kein Problem.

Schließlich hatte sie nur noch zwei Kabel anzuklemmen, als plötzlich das Helmlicht erlosch. Der Roboter