Doctor Horrible Sex, Blut und Heavy Metal

Titel

Kapitel 1

Kapitel 2

Kapitel 3

Kapitel 4

Kapitel 5

Kapitel 6

Kapitel 7

Kapitel 8

Kapitel 9

Kapitel 10

Kapitel 11

Kapitel 12

Kapitel 13

Kapitel 14

Kapitel 15

Kapitel 16

Kapitel 17

Kapitel 18

Doctor HorribleSex, Blut und Heavy Metal

A.A. Bort

Doctor Horrible

Band 1

Copyright 2014 by A.A. Bort

alle Rechte vorbehalten

Kapitel 1

Kapitel 1 – Hoher Besuch

In einem dunklen Wald, am Rande der Welt, steht ein Haus.

Seit Jahren fürchten sich die Menschen der naheliegenden Stadt davor.

Die Geräusche die aus dem Haus drangen, verhießen nichts gutes.

Ein Mann verließ das Haus einmal die Woche, um die nötigen Besorgungen zu machen.

Sein Name war Dr. Grauenhaft.

Mit seinem Partner Dr. Gruselitch, führte er Forschungen im Namen der Wissenschaft durch.

Doch ihre Abgeschiedenheit, schien ihre Gedanken zu verwirren.

Die Menschen mieden das Haus, genauso wie den Wald.

Eines Tages schlich ein Mann durch den Wald.

Er zog einen großen Koffer hinter sich her, aus dem Hilfeschreie unüberhörbar klangen.

Als er das Haus der beiden Doktoren fand, stellte er den Koffer an die Hausmauer und klopfte.

Die Tür öffnete sich und Dr. Grauenhaft baute sich vor ihm auf.

~ Hallo mein Freund~ begrüßte er ihn.

Der Besuch war niemand anderes als Dr. Reichhardt.

Im Auftrag einer Organisation, die er verschwieg, unterstützte er die beiden Doktoren.

Dr. Grauenhaft half ihm, den Koffer in das Haus zu bringen.

Die blutverschmierten Gerätschaften, standen im Haus verstreut.

Der Koffer wurde in den Keller gebracht und geöffnet.

Ein junger Mann fiel heraus, orientierte sich und flehte Dr. Gruselitch um Hilfe an.

Doch dieser schnappte den Mann und fesselte ihn auf einer Trage.

Dr. Reichhardt stand nur da und beobachtete.

Ein Greifarm griff sich den rechten Arm des Mannes, ein anderer den linken Arm.

Dr. Gruselitch lächelte und betätigte einen Knopf.

Mit einem lauten Krachen und unter den Schreien des Mannes, wurden die *zensiert vom *zensiert getrennt.

Sofort verschloss Dr. Grauenhaft die Wunden.

Die abgetrennten *zensiert wurden an eine Maschine angeschlossen.

Während der Mann ohnmächtig auf dem Tisch lag, öffnete Dr. Grauenhaft mit einer Säge den *zensiert.

Ein kleiner Mikrochip wurde implantiert.

Nun warteten die drei Doktoren, bis der Mann aufwachte.

Er schrie und wand sich auf dem Tisch, doch die Doktoren ignorierten ihn und schauten auf die Maschine.

Die daran montierten Arme zuckten und schließlich bewegten sie sich.

Fröhlich klatschte Dr. Reichhardt in die Hände.

~ Wunderbar, es funktioniert~.

~ Ich werde die Fortschritte mitteilen~.

~ Der Durchbruch steht kurz bevor, so glaube ich~.

~ Macht weiter so~ sagte Dr. Reichhardt und verließ das Haus der Wissenschaftler.

Kapitel 2

Kapitel 2 - Verrat

Einige Tage vergingen, bis die Tür des Hauses aufbrach.

Die beiden Doktoren arbeiteten gerade im Keller, als sie den Lärm bemerkten.

Das Militär stürmte den Keller, doch damit lösten sie tödliche Fallen aus.

Der erste wurde von scharfen Drahtseilen *zensiert, da die folgenden Männer ihn hinein drückten.

Dr. Gruselitch und Dr. Grauenhaft aktivierten die restlichen Fallen, schnappten sich einige ihrer Erfindungen und verschwanden durch die Hintertür.

Hinter den Soldaten trat Dr. Reichhardt in den Raum.

~ Haben wir sie?~ fragte er die dumm in der Gegend herumstehenden Soldaten.

Diese zuckten mit den Schultern.

Ein Soldat namens Berrimorr hatte eine Entdeckung gemacht und stotterte ~ Die sind hinten raus~.

Dr. Reichhardt bemerkte ein Geräusch ~ Hört ihr das?~

Mit einem lauten Knall flog das Haus in die Luft.

Es regnete *zensiert vom Himmel.

Die Menschen der naheliegenden Stadt eilten herbei.

Jubel brach aus, dachten die Menschen doch, das die Doktoren tot wären.

Dr. Reichhardt arbeitete sich aus dem Schutt hinaus, zückte sein Telefon und wählte eine Nummer die er auf dem Unterarm tätowiert hatte.

Er klopfte sich den Staub vom Anzug.

Dr. Gruselitch beobachtete aus dem Dickicht die Situation.

Mit einem starren Blick sagte er ~ Dr. Grauenhaft, ich glaube es ist Zeit~.

Dann sagten beide gleichzeitig ~ Wir gehen nach New York~.

Der Tod persönlich brachte sie dort hin. In ihren Fantasien dachten sie dies jedenfalls.

Allerdings sah die Realität anders aus.

Sie wanderten zu einem Rastplatz und sahen sich nach einem fahrbaren Untersatz um.

Ein dicker Lastwagenfahrer, der gerade von der Toilette kam und sich den Mund abwischte, sah wie ein leichtes Ziel aus.

Die beiden schlichen sich an den Lastwagen heran, rissen die Beifahrertür auf und erschraken.

Niemand.

Doch hinter dem Vorhang, der hinter den Sitzen war, hörten sie und leises Schnarchen.

Sie schauten sich an, grinsten und bestiegen den Lastwagen.

In einer großen Tasche hatten sie alles dabei, was sie brauchten.

Dr. Grauenhaft kramte in der Tasche und zog eine Art kleinen Bolzen heraus.

Gerade mal so groß wie ein Finger, war dieses Gerät.

Dr. Gruselitch warf sich auf den dicken Mann und Dr. Grauenhaft versuchte das Gerät, dem Kerl in den Mund zu stecken.

Doch es klappte nicht und der dicke Mann drehte sich.

Nun war Dr. Grauenhaft klar, dass er es von hinten anpacken musste.

Der dicke Lastwagenfahrer wehrte sich, doch der Doktor schaffte es mit einer *zensiert, das Gerät zu versenken.

Kapitel 3

Kapitel 3 – Vorsicht Sprengung

Der dicke Lastwagenfahrer ließ nun von Dr. Gruselitch ab und stürzte sich auf Dr. Grauenhaft.

Doch dieser sprang aus dem Lastwagen.

Der Fahrer des Lastwagens blieb mit seiner heruntergelassenen Hose am Sitz hängen und stürzte mit dem Gesicht voraus aus dem Lastwagen.

Einige laute *zensiert später, stand der dicke Kerl auf.

Blutüberströmt stand er vor Dr. Grauenhaft.

Die Nase schien *zensiert und die Zähne fielen ihm aus dem *zensiert.

~ Holt das Ding aus meinem *zensiert~ schrie er.

Verzweifelt versuchte er mit seinen Fingern in seinen *zensiert einzudringen.

Nun kam Dr. Gruselitch hinzu.

Aus der Tasche holte er einen Schalter und legte seinen Finger darauf.

~ Auf Wiedersehen~ sagte er und drückte.

Der dicke Lastwagenfahrer *zensiert.

*zensiert und *zensiert flogen hoch in die Luft, wie eine Fontäne.

Der Lastwagen war nun ihnen, sie warfen ihre Taschen auf das Bett hinter den Sitzen.

Dr. Grauenhaft setzte sich ans Steuer und fuhr los.

Doch dann stoppte er und fuhr ein Stück zurück.

Dr. Gruselitch öffnete das Fenster und fing den *zensiert des Lastwagenfahrers, der vom Lastwagen rollte.

In der Mitte der Kabine hingen Würfel.

Dr. Gruselitch entfernte diese und hängte den *zensiert dorthin.

Nun fuhren sie los.

Als der Tank des Lastwagens fast leer war, fuhren sie an eine Tankstelle

So richtig wussten sie nicht wie das funktionierte, deshalb fragten sie eine Frau, die gerade ihren Sportwagen betankte.

Als die Frau zu dem Lastwagen herüber kam und auf den Tankdeckel zeigte, zog Dr. Grauenhaft eine Metalldose mit einer Nadel aus der Tasche und *zensiert sie der Frau in die Seite.

Dr. Gruselitch stützte sie, damit sie nicht auf den Boden fiel.

Einige Menschen in der Umgebung bemerkten, dass da etwas nicht stimmte und rannten zu den beiden Doktoren.

Sie warfen die Frau in den Lastwagen.

Die aufgebrachten Menschen griffen die beiden an.

Dr. Grauenhaft reagierte schnell und zog eine Art Gartengerät aus der Tasche.

Er startete den Apparat und *zensiert einem Mann eine *zensiert vom Gesicht.

Der nächste bekam die scharfen Klingen direkt an den *zensiert, woraufhin sein *zensiert auf den Boden rollte.

Nun flohen die noch verbliebenen Menschen, sofern sie konnten.

Dr. Gruselitch sah sich um und beruhigte Dr. Grauenhaft.

~ Schalt ab, die sind alle Weg~.

Nun mussten sie nur noch Tanken.

Kapitel 4

Kapitel 4 – Scharfe Klingen

Der Tankwart hatte natürlich die Polizei gerufen.

Nur einen Fehler machte er.

Ohne auf die Polizei zu warten, schnappte er sich seine Schrotflinte und versuchte die beiden Doktoren an der Weiterfahrt zu hindern.

Sie ignorierten ihn bis der Tank des Lastwagens voll war.

Nun war er auch nah genug.

Mit einer blitzschnellen Bewegung, schnappte sich Dr. Gruselitch den Tankwart, nahm ihm seine Flinte ab und hielt ihn fest.

Dr. Grauenhaft holte derweil den Tankschlauch.

Diesen Schlauch *zensiert er dem Tankwart in den *zensiert.

Als das Benzin aus der Nase *zensiert, hörte er auf.

Merkwürdigerweise lebte der Mann noch, bevor sie ihn mit Benzin übergossen und *zensiert.

Er rannte wie wild umher, bis schließlich und Feuersäule aus seinem *zensiert schoss und er *zensiert.

Den Tankschlauch ließen sie liegen und verkeilten ihn so, dass sich die gesamte Tankstelle mit Benzin füllte.

Nun stiegen sie ein und fuhren los, kurz bevor die Polizei eintraf.

Die Polizisten stiegen aus ihrem Wagen und schauten sich angewidert um.

Sie erblickten den davonfahrenden Lastwagen, stiegen wieder in ihr Fahrzeug und versuchten es zu starten.

Im selben Moment warf Dr. Gruselitch ein Streichholz in die Benzinlache und die Tankstelle *zensiert in die Luft.

Einige Stunden später, fuhren die beiden Doktoren auf der Landstraße, als sie hinter sich ein Geräusch bemerkten.

Da fiel ihnen ein, dass sie die Frau von der Tankstelle noch dabei hatten.

Dr. Grauenhaft stieg zu ihr in die Schlafkabine.

~ Lass mir auch noch was übrig~ sagte Dr. Gruselitch der den Lastwagen steuerte.

Als die Frau zu sich kam, war sie *zensiert und lag mit dem *zensiert nach unten auf der schmutzigen Matratze.

Da ihr die Augen verbunden waren, konnte sie nichts sehen, aber sie spürte einen *zensiert zwischen ihren *zensiert und hörte ein *zensiert hinter sich.

Ein warmes weiches *zensiert spürte sie plötzlich, dann war das Geräusch weg.

Sie hörte wie zwei Männer sich unterhielten und eine der beiden Stimme näher kam.

Dr. Grauenhaft und Dr. Gruselitch tauschten nun die Plätze.

Die Frau bemerkte das sich etwas hinter sie bewegte.

Kurze Zeit später begann das *zensiert von neuem und sie spürte wie etwas in sie *zensiert.

Am nächsten Rastplatz hielten sie an.

An einem kleinen Kiosk holten sie etwas zu trinken.

Dort *zensiert sie einen Mann, den sie zu der Frau in die Schlafkabine steckten.

Den Rest der Menschen auf dem Rastplatz, *zensiert und *zensiert sie.

Weit war es nicht mehr bis New York, aber wo könnten sie Unterschlupf finden, da mittlerweile die gesamte Polizei nach ihnen suchte.

Kapitel 5

Kapitel 5 – Ein neues Haus kommt selten allein

Die Unfähigkeit der Polizei sorgte dafür, dass die Doktoren weiterhin auf ihrem Weg nach New York waren.

Allerdings gab es auch nie Überlebende, egal wo sie halt machten.

Bei Elizabeth, verließen sie die Route 95.

In der Stadt fuhren sie umher, bis sie in der Magnolia Ave ein kleines Haus fanden, dass unbewohnt aussah.

Den Anwohnern fiel der Lastwagen sofort auf.

Da die Doktoren aber nicht sofort die Aufmerksamkeit auf sich ziehen wollten, grüßten sie freundlich und brachen mit einem heftigen Ruck, die Tür des Hauses auf.

Es war niemand zu Hause, nachdem wie es in dem Haus aussah, schien hier auch niemand zu wohnen.

Eine neugierige Nachbarin, die direkt nebenan wohnte, kam sofort hinüber.

~ Hallo, ist wer da?~ fragte sie

Dr. Grauenhaft setzte sich ein breites Grinsen auf, trat aus dem Wohnzimmer und ging auf die Haustür zu.

~ Ja Hallo, was kann ich für sie tun?~

Die Frau bekam ein